Structure of the wavefunction array

psi(dgldim)

| Ψ |

psi(adim)

| A psi(totphidim)

| φ |

zpsi(1) zetf(1,1)

| · · · psi(block(s))

| A^{(s)} | · · · | · · · psi(phidim(m))

| φ^{(m)} | · · · |

zpsi(s) zetf(m,1)

| · · · | · · · | psi(subdim(m),dim(m,s))

| φ^{(m,s)} | | · · · |

zetf(m,s)

Figure 1: The structure of the wave function